"use client";




import HVACPlantPortal from "@/components/dashboard/iotapplication/hvacPlant";



export default function HVACPlantPage() {
  return (
    

        <div className="p-6 mx-2">
           <HVACPlantPortal/> 
        
        </div>
   
  );
}